) (GeV) ν(e_Tm

60 70 80 90 100 events / 0.5 GeV

0

500

1000

1500

) MeV

stat 48 ± = (80493 WM /dof = 86 / 48 2χ

-1 200 pb ≈ L dt ∫ CDF II preliminary