[GeV/c] Tp 100 200 300 400 500 600

[pb / (GeV/c)]

〉 _T / dp σ d〈

10^{-3}

10^{-2}

10^{-1} 1 10 10^2

10^3

|y| < 0.5 1.5 < |y| < 2.0 2.0 < |y| < 2.4 NLO (JETRAD) CTEQ6M max T = 0.5 p Rμ = _Fμ

=1.3, sep R

Run II preliminary OD

-1 = 143 pb intL

=1.96TeV s data , Cone R=0.7 OD