/ ndf

2χ 3.2119 / 7 Prob 0.86473 p0 0.0059113 ± 0.0050603 p1 0.00008889 ± -0.00033063 p2 2.1711e-06 ± -3.6894e-06

0z -80 0 80

) _T (TeV/p Δ

-0.05

-0.04

-0.03

-0.02

-0.01 0 0.01

0.02

0.03 ± ± ±

/ ndf

2χ 16.118 / 7 Prob 0.024059 p0 0.018646 ± -0.038749 p1 0.020402 ± 0.043116

0z -80 0 80

(mrad) 0 ϕΔ

-0.02

-0.015

-0.01

-0.005 0 0.005

0.01

0.015 ± ±

/ ndf

2χ 19.919 / 6 Prob 0.0028632 p0 0.9717±

-1.2203 p1 0.014594 ± -0.044711 p2 0.00035788 ± 0.00035399

0z -80 0 80 m) μ (_0dΔ

-8 -6 -4 -2 0 2 4 6 ± ±

/ ndf

2χ 126.95 / 7 Prob 0 p0 1.3814e-05 ± -8.7898e-06 p1 2.0799e-07 ± -6.5411e-06 p2 5.0923e-09 ± 1.0953e-08

0z -80 0 80 θ cot Δ

-0.6

-0.4

-0.2 0

0.2 0.4

0.6 -3 10× ± ± ±

0z -80 0 80

(cm) 0zΔ

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01

0.012

0z -80 0 80

(ns) 0tΔ

-0.015

-0.01

-0.005 0 0.005

0.01

0.015

0.02