/ ndf

2χ 8.7135 / 12 Prob 0.72719 p0 0.015394 ± -0.017937 p1 0.0062144 ± -0.0017958 p2 0.011804 ± -0.015433

0 ϕ 4 6 curv Δ

-0.06

-0.04

-0.02

0

0.02 ± ± ±

/ ndf

2χ 10.574 / 12 Prob 0.56577 p0 0.0063443 ± -0.0020814 p1 0.002568 ± 0.003981 p2 0.0048464 ± -0.0010025

0 ϕ 4 6

0ϕΔ

-0.03

-0.02

-0.01

-0

0.01

0.02 ± ± ±

/ ndf

2χ 8.5608 / 12 Prob 0.73992 p0 2.5140±

-2.1568 p1 1.01158 ± -0.31222 p2 1.9175±

-2.0484

0 ϕ 4 6

0dΔ

-8 -6 -4 -2 0 2 4 6 ±

/ ndf

2χ 8.8531 / 12 Prob 0.71543 p0 3.6171e-05 ± 3.3058e-05 p1 1.4562e-05 ± -1.7718e-06 p2 2.7761e-05 ± 3.8639e-05

0 ϕ 4 6 θ cot Δ

-0.1

-0.05

0

0.05

0.1

-3 10× ± ± ±

/ ndf

2χ 7.0292 / 12 Prob 0.85568 p0 0.0031694 ± 0.0024627 p1 0.00127518 ± -0.00089464 p2 0.0024313 ± 0.0019689

0 ϕ 4 6

0zΔ

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01

0.012 ± ± ±

/ ndf

2χ 19.67 / 12 Prob 0.073597 p0 0.003613 ± 0.010324 p1 0.0014442 ± 0.0017089 p2 0.0027507 ± 0.0033465

0 ϕ 4 6

0tΔ

-0.02

-0.015

-0.01

-0.005 0 0.005

0.01

0.015 ± ± ±