/ ndf

2χ 6.541 / 7 Prob 0.47818 p0 0.005085 ± -0.001191 p1 0.0106003 ± 0.0099608 p2 0.0221920 ± -0.0084591

θ cot -1 0 1

) _T (TeV/p Δ

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06 ± ± ±

/ ndf

2χ 8.5867 / 7 Prob 0.28371 p0 0.0021066 ± 0.0010579 p1 0.0045264 ± -0.0077953 p2 0.0096216 ± -0.0044517

θ cot -1 0 1

(mrad) 0 ϕΔ

-0.02

-0.01

0 0.01

0.02

0.03 ± ± ±

/ ndf

2χ 4.5632 / 7 Prob 0.71309 p0 0.83355 ± 0.14148 p1 1.7378±

2.2093 p2 3.6233±

-4.7952

θ cot -1 0 1 m) μ (_0dΔ

-12 -10 -8 -6 -4 -2 0 2 4 6 8 ± / ndf

2χ 14.036 / 7 Prob 0.050552 p0 1.1910e-05 ± 1.4722e-06 p1 2.4642e-05 ± -2.0575e-05 p2 5.1277e-05 ± 9.8474e-05

θ cot -1 0 1 θ cot Δ

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 -3 10× ± ± ±

θ cot -1 0 1

(cm) 0zΔ

-0.005

0

0.005

0.01

0.015

θ cot -1 0 1

(ns) 0tΔ

-0.01

0

0.01

0.02

0.03