p (GeV)

0 20 40 60 80 100 120 140 160 180 200

Ncosmics

0

50000

Entries 696416 Mean 31.399 RMS 30.026 Underflow 0 Overflow 10637 Integral 6.8578e+05 -μ and

+μ^+μ^-μ