Entries 4.494296e+07 Mean -0.0045095 RMS 132.85 Underflow 2420.9 Overflow 2544.4 Integral 3.8931e+07

m) μ Y ( Δ -1000 -800 -600 -400 -200 0 200 400 600 800 1000 number of hits

0

1000

2000

3000 310 ×