Entries 168 Mean 0.026356 RMS 0.079208 Underflow 0 Overflow 0 Integral 168

R (mm) Δ -5 0 5

SL0 cells

0

20

40

60

80

100

Entries 192 Mean 0.0045229 RMS 0.085138 Underflow 0 Overflow 0 Integral 192

R (mm) Δ -5 0 5

SL1 cells

0

20

40

60

80

100

Entries 240 Mean -0.0096993 RMS 0.10802 Underflow 0 Overflow 0 Integral 240

R (mm) Δ -5 0 5

SL2 cells

0

20

40

60

80

100

120 Entries 288 Mean -0.036924 RMS 0.096086 Underflow 0 Overflow 0 Integral 288

R (mm) Δ -5 0 5

SL3 cells

0 20 40 60 80 100 120 140 160 180 200

Entries 336 Mean -0.017417 RMS 0.11904 Underflow 0 Overflow 0 Integral 336

R (mm) Δ -5 0 5

SL4 cells

0 20 40 60 80 100 120 140 160 Entries 384 Mean -0.031954 RMS 0.11014 Underflow 0 Overflow 0 Integral 384

R (mm) Δ -5 0 5

SL5 cells

0 20 40 60 80 100 120 140 160 180 200 220

Entries 432 Mean 0.01977 RMS 0.13858 Underflow 0 Overflow 0 Integral 432

R (mm) Δ -5 0 5

SL6 cells

0 20 40 60 80 100 120 140 160 180 200 Entries 480 Mean 0.050304 RMS 0.17995 Underflow 0 Overflow 0 Integral 480

R (mm) Δ -5 0 5

SL7 cells

0

50

100

150

200

250