θ cot

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 number of cosmics

0

20000

40000

Entries 696416 Mean 0.0010951 RMS 0.32358 Underflow 96165 Overflow 2696 Integral 5.9756e+05