) T (TeV/p Δ -10 0 10 cosmics

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Entries 246946 Mean -0.0023633 RMS 1.8552 Underflow 5.34 Overflow 6.34 Integral 2.1656e+05

(mrad) 0 ϕΔ -5 0 5 cosmics

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

Entries 246946 Mean 0.00048772 RMS 0.77097 Underflow 3 Overflow 5.9 Integral 2.1656e+05

m) μ (_0dΔ

-2000 0 2000 cosmics

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

Entries 246946 Mean -0.47377 RMS 304.41 Underflow 2 Overflow 1 Integral 2.1656e+05

θ cot Δ -0.04 0 0.04 cosmics

0 5000

10000

15000

20000

25000

30000

Entries 246946 Mean 1.4762e-05 RMS 0.0043447 Underflow 0 Overflow 1 Integral 2.1655e+05

(cm) 0zΔ -2 0 2 cosmics

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 246946 Mean 0.00019787 RMS 0.38053 Underflow 7.34 Overflow 2 Integral 2.1656e+05

(ns) 0tΔ -2 0 2 cosmics

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 246946 Mean -0.0041153 RMS 0.43582 Underflow 9.68 Overflow 3.34 Integral 2.1656e+05