Entries 168 Mean -4.3198 RMS 1.442 Underflow 0 Overflow 0 Integral 168

m) (z=155) μ (ϕΔR -300 0 300

SL0 cells

0 20 40 60 80 100 120 140 160 Entries 192 Mean 0.37168 RMS 0.95861 Underflow 0 Overflow 0 Integral 192

m) (z=155) μ (ϕΔR -300 0 300

SL1 cells

0

20 40

60

80 100

120

Entries 240 Mean 3.8742 RMS 1.7549 Underflow 0 Overflow 0 Integral 240

m) (z=155) μ (ϕΔR -300 0 300

SL2 cells

0 20 40 60 80 100 120 140 160 180 200 220 240 Entries 288 Mean 0.66352 RMS 1.1311 Underflow 0 Overflow 0 Integral 288

m) (z=155) μ (ϕΔR -300 0 300

SL3 cells

0 20 40 60 80 100 120 140 160 180 200 220

Entries 336 Mean 1.0091 RMS 1.5528 Underflow 0 Overflow 0 Integral 336

m) (z=155) μ (ϕΔR -300 0 300

SL4 cells

0

50

100

150

200

250 Entries 384 Mean 0.78473 RMS 1.3232 Underflow 0 Overflow 0 Integral 384

m) (z=155) μ (ϕΔR -300 0 300

SL5 cells

0

50

100

150

200

250

Entries 432 Mean -3.953 RMS 1.4537 Underflow 0 Overflow 0 Integral 432

m) (z=155) μ (ϕΔR -300 0 300

SL6 cells

0 50 100 150 200 250 300 350 400 Entries 480 Mean 1.0329 RMS 1.3798 Underflow 0 Overflow 0 Integral 480

m) (z=155) μ (ϕΔR -300 0 300

SL7 cells

0 50 100 150 200 250 300 350 400