Entries 168 Mean -7.5284e-07 RMS 1.4122e-05 Underflow 0 Overflow 0 Integral 168

(tilt) Φ sin Δ -0.005 0 0.005

SL0 cells

0 10 20 30 40 50 60 70 80 90 Entries 192 Mean 1.097e-07 RMS 1.3908e-05 Underflow 0 Overflow 0 Integral 192

(tilt) Φ sin Δ -0.005 0 0.005

SL1 cells

0

20

40

60

80

100

Entries 240 Mean 2.1932e-06 RMS 1.8707e-05 Underflow 0 Overflow 0 Integral 240

(tilt) Φ sin Δ -0.005 0 0.005

SL2 cells

0 20 40 60 80 100 120 Entries 288 Mean 4.4903e-07 RMS 1.7981e-05 Underflow 0 Overflow 0 Integral 288

(tilt) Φ sin Δ -0.005 0 0.005

SL3 cells

0 20 40 60 80 100 120 140

Entries 336 Mean 5.8243e-07 RMS 1.9275e-05 Underflow 0 Overflow 0 Integral 336

(tilt) Φ sin Δ -0.005 0 0.005

SL4 cells

0 20 40 60 80 100 120 140 160 180 Entries 384 Mean 1.7478e-06 RMS 2.3238e-05 Underflow 0 Overflow 0 Integral 384

(tilt) Φ sin Δ -0.005 0 0.005

SL5 cells

0 20 40 60 80 100 120 140 160 180 200 220

Entries 432 Mean 1.7242e-06 RMS 2.2512e-05 Underflow 0 Overflow 0 Integral 432

(tilt) Φ sin Δ -0.005 0 0.005

SL6 cells

0 20 40 60 80 100 120 140 160 180 200 220 Entries 480 Mean -1.0507e-06 RMS 2.2611e-05 Underflow 0 Overflow 0 Integral 480

(tilt) Φ sin Δ -0.005 0 0.005

SL7 cells

0

50

100

150

200

250