Entries 168 Mean 0.042081 RMS 0.41579 Underflow 0 Overflow 0 Integral 168

m) (z=0) μ (ϕΔR -300 0 300

SL0 cells

0 10 20 30 40 50 60 70 80 90 Entries 192 Mean 0.031923 RMS 0.36488 Underflow 0 Overflow 0 Integral 192

m) (z=0) μ (ϕΔR -300 0 300

SL1 cells

0

20

40

60

80

100

Entries 240 Mean -0.028665 RMS 0.54883 Underflow 0 Overflow 0 Integral 240

m) (z=0) μ (ϕΔR -300 0 300

SL2 cells

0

20 40

60 80

100 120 Entries 288 Mean -0.053426 RMS 0.42791 Underflow 0 Overflow 0 Integral 288

m) (z=0) μ (ϕΔR -300 0 300

SL3 cells

0 20 40 60 80 100 120 140 160

Entries 336 Mean -0.043364 RMS 0.55345 Underflow 0 Overflow 0 Integral 336

m) (z=0) μ (ϕΔR -300 0 300

SL4 cells

0 20 40 60 80 100 120 140 160 180 Entries 384 Mean -0.021687 RMS 0.58597 Underflow 0 Overflow 0 Integral 384

m) (z=0) μ (ϕΔR -300 0 300

SL5 cells

0 20 40 60 80 100 120 140 160 180 200

Entries 432 Mean 0.043728 RMS 0.65235 Underflow 0 Overflow 0 Integral 432

m) (z=0) μ (ϕΔR -300 0 300

SL6 cells

0 20 40 60 80 100 120 140 160 180 200 220 Entries 480 Mean 0.030091 RMS 0.62918 Underflow 0 Overflow 0 Integral 480

m) (z=0) μ (ϕΔR -300 0 300

SL7 cells

0

50

100

150

200

250